From 4642216f70dd98134a79f9299b7ca4bc876649c7 Mon Sep 17 00:00:00 2001
From: Vito Caputo <vcaputo@gnugeneration.com>
Date: Sun, 28 Aug 2016 00:36:53 -0700
Subject: *: refactor all the things

Long overdue house cleaning.

The addition of compositing/monitoring overlays in vwm3 pushed vwm well past
what is a reasonable size for a simple thousand line file.  This is a first
step towards restoring sanity in the code, but no behavioral differences are
intended, this is mostly just shuffling around and organizing code.

I expect some performance regressions initially, follow-on commits will make
more improvements to that end as the dust settles.
---
 libvmon/defs/sys_wants.def | 7 -------
 1 file changed, 7 deletions(-)
 delete mode 100644 libvmon/defs/sys_wants.def

(limited to 'libvmon/defs/sys_wants.def')

diff --git a/libvmon/defs/sys_wants.def b/libvmon/defs/sys_wants.def
deleted file mode 100644
index 750d7bb..0000000
--- a/libvmon/defs/sys_wants.def
+++ /dev/null
@@ -1,7 +0,0 @@
-#include "_begin.def"
-
-/* the available sys-wide wants */
-vmon_want(SYS_STAT,		sys_stat,		sys_sample_stat)
-vmon_want(SYS_VM,		sys_vm,			sys_sample_vm)
-
-#include "_end.def"
-- 
cgit v1.2.3

