From 4642216f70dd98134a79f9299b7ca4bc876649c7 Mon Sep 17 00:00:00 2001
From: Vito Caputo <vcaputo@gnugeneration.com>
Date: Sun, 28 Aug 2016 00:36:53 -0700
Subject: *: refactor all the things

Long overdue house cleaning.

The addition of compositing/monitoring overlays in vwm3 pushed vwm well past
what is a reasonable size for a simple thousand line file.  This is a first
step towards restoring sanity in the code, but no behavioral differences are
intended, this is mostly just shuffling around and organizing code.

I expect some performance regressions initially, follow-on commits will make
more improvements to that end as the dust settles.
---
 libvmon/defs/proc_files.def | 8 --------
 1 file changed, 8 deletions(-)
 delete mode 100644 libvmon/defs/proc_files.def

(limited to 'libvmon/defs/proc_files.def')

diff --git a/libvmon/defs/proc_files.def b/libvmon/defs/proc_files.def
deleted file mode 100644
index 6e3db98..0000000
--- a/libvmon/defs/proc_files.def
+++ /dev/null
@@ -1,8 +0,0 @@
-#include "_begin.def"
-
-		/* 		member name,		symbolic constant,	human label,		human description (think UI/help) */
-	/* /proc/$pid/fd */
-vmon_datum_int(			fdnum,			FILES_FDNUM,		"FdNum",		"File descriptor number (historically 0-255)")
-vmon_datum_char_array(		object_path,		FILES_OBJPATH,		"ObjPath",		"Object path this descriptor represents a handle for")
-
-#include "_end.def"
-- 
cgit v1.2.3

