From 4642216f70dd98134a79f9299b7ca4bc876649c7 Mon Sep 17 00:00:00 2001
From: Vito Caputo <vcaputo@gnugeneration.com>
Date: Sun, 28 Aug 2016 00:36:53 -0700
Subject: *: refactor all the things

Long overdue house cleaning.

The addition of compositing/monitoring overlays in vwm3 pushed vwm well past
what is a reasonable size for a simple thousand line file.  This is a first
step towards restoring sanity in the code, but no behavioral differences are
intended, this is mostly just shuffling around and organizing code.

I expect some performance regressions initially, follow-on commits will make
more improvements to that end as the dust settles.
---
 colors.def | 6 ------
 1 file changed, 6 deletions(-)
 delete mode 100644 colors.def

(limited to 'colors.def')

diff --git a/colors.def b/colors.def
deleted file mode 100644
index 97c0dc9..0000000
--- a/colors.def
+++ /dev/null
@@ -1,6 +0,0 @@
-color(focused_window_border, "Green")
-color(shelved_window_border, "purple")
-color(unfocused_window_border, "DarkGray")
-color(shelved_console_border, "red")
-color(rubberband, "Orange")
-color(logo, "LimeGreen")
-- 
cgit v1.2.3

